Vd[vnum]

Qualifier=

Dataset=bat85s
vnum=9

     0.200

B1

B1.0mag(batmodel..S11[vnum-1])

 0.0

B20.0  GHz
freq

 100.0  MHz

A1

A1.0mag(Sr)

A20.0  GHz

FREQ

B1B1

Bbatmodel..S11[vnum-1]

Y-FS= 1.0

B5.075  GHz

A1A1M1I2=

I1=1.5925E+09

M1=Z0*(30.670E-03+j273.25E-03)

ASrY-FS= 1.0

M1